%&LaTeX
\documentclass{article}

\usepackage{soul}
\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Voronov_etal1992} Voronov BM, Gershenzon EM, Gol{\textquoteright}tsman GN, Gogidze IG, Gusev YP, Zorin MA, et al. Picosecond range detector base on superconducting niobium nitride film sensitive to radiation in spectral range from millimeter waves up to visible light. Sverkhprovodimost{\textquoteright}: Fizika, Khimiya, Tekhnika. 1992;5(5):955--60.

\end{thebibliography}

\end{document}

