%&LaTeX
\documentclass{article}

\usepackage{soul}
\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Pentin_etal2017} Pentin I, Finkel M, Maslennikov S, Vakhtomin Y, Smirnov K, Kaurova N, et al. Superconducting hot-electron-bolometer mixers for the mid-IR. Rus J Radio Electron [Internet]. 2017 [cited 2024 Jun 22];(10):http://jre.cplire.ru/jre/oct17/9/text.pdf. Available from: \ul{http://jre.cplire.ru/jre/oct17/9/abstract_e.html}

\end{thebibliography}

\end{document}

