%&LaTeX
\documentclass{article}

\usepackage{soul}
\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Korneeva_etal2021} Korneeva YP, Manova NN, Dryazgov MA, Simonov NO, Zolotov PI, Korneev AA. Influence of sheet resistance and strip width on the detection efficiency saturation in micron-wide superconducting strips and large-area meanders. Supercond Sci Technol. 2021;34(8):084001.

\end{thebibliography}

\end{document}

