%&LaTeX
\documentclass{article}

\usepackage{soul}
\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Goltsman_etal1991} Gol{\textquoteright}tsman GN, Semenov AD, Gousev YP, Zorin MA, Gogidze IG, Gershenzon EM, et al. Sensitive picosecond NbN detector for radiation from millimetre wavelengths to visible light. Supercond Sci Technol. 1991;4(9):453--6.

\end{thebibliography}

\end{document}

