%&LaTeX
\documentclass{article}

\usepackage{soul}
\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Shitov_etal2001} Shitov SV, Levitchev M, Veretennikov AV, Koshelets VP, Prokopenko GV, Filippenko LV, et al. Superconducting integrated receiver as 400-600 GHz tester for coolable devices. IEEE Trans. Appl. Supercond.. 2001;11(1):832--5.

\end{thebibliography}

\end{document}

