%&LaTeX
\documentclass{article}

\usepackage{soul}
\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Maslennikov_etal2002} Maslennikov S, Antipov S, Shishkov A, Svechnikov S, Voronov B, Smirnov K, et al. NbN HEB mixer noise temperature measurements with hot/cold load mounted inside the helium cryostat at 300 GHz. In: Proc. Int. Student Seminar on Microwave Appl. of Novel Physical Phenomena supported by IEEE. St.-Petersburg: LETI; 2002.

\end{thebibliography}

\end{document}

