%&LaTeX
\documentclass{article}

\usepackage{soul}
\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Baselmans_etal2004} Baselmans JJA, Hajenius M, Gao JR, Klapwijk TM, de Korte PAJ, Voronov B, et al. Doubling of sensitivity and bandwidth in phonon cooled hot electron bolometer mixers. Appl Phys Lett. 2004;84(11):1958--60.

\end{thebibliography}

\end{document}

