%&LaTeX
\documentclass{article}

\usepackage{soul}
\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Kenyon_etal2006} Kenyon M, Day PK, Bradford CM, Bock JJ, Leduc HG. Background-limited membrane-isolated TES bolometers for far-IR/submillimeter direct-detection spectroscopy. Nucl. Instr. \& Meth. Phys. Res. A. 2006;559:456--8.

\end{thebibliography}

\end{document}

