%&LaTeX
\documentclass{article}

\usepackage{soul}
\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Shitov+Vystavkin2006} Shitov SV, Vystavkin AN. A design analysis of imaging radiometer with antenna-coupled transition-edge sensors. Nuclear Instruments and Methods in Physics Research A. 2006;559:503--5.

\end{thebibliography}

\end{document}

