%&LaTeX
\documentclass{article}

\usepackage{soul}
\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Gordon_etal2006} Gordon NT, Lees DJ, Bowen G, Phillips TS, Haigh M, Jones CL, et al. HgCdTe detectors operating above 200 K. J. Electron. Mater.. 2006;35(6):1140--4.

\end{thebibliography}

\end{document}

