%&LaTeX
\documentclass{article}

\usepackage{soul}
\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Floet_etal1998} Floet DW, Baselmans JJA, Klapwijk TM, Gao JR. Resistive transition of niobium superconducting hot-electron bolometer mixers. Appl Phys Lett. 1998;73(19):2826.

\end{thebibliography}

\end{document}

