%&LaTeX
\documentclass{article}

\usepackage{soul}
\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Goltsman_etal2005} Goltsman GN, Vachtomin YB, Antipov SV, Finkel MI, Maslennikov SN, Polyakov SL, et al. Low-noise NbN phonon-cooled hot-electron bolometer mixers for terahertz heterodyne receivers. In: Proc. 9-th WMSCI. Vol 9. International Institute of Informatics and Systemics; 2005. p. 154--9.

\end{thebibliography}

\end{document}

