%&LaTeX
\documentclass{article}

\usepackage{soul}
\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Kawamura_etal2000} Kawamura J, Blundell R, Tong C-YE, Papa DC, Hunter TR, Paine SN, et al. Superconductive hot-electron-bolometer mixer receiver for 800-GHz operation. IEEE Trans Microw Theory Techn. 2000;48(4):683--9.

\end{thebibliography}

\end{document}

