%&LaTeX
\documentclass{article}

\usepackage{soul}
\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Sprengers_etal2011} Sprengers JP, Gaggero A, Sahin D, Jahanmirinejad S, Frucci G, Mattioli F, et al. Waveguide superconducting single-photon detectors for integrated quantum photonic circuits. Appl Phys Lett. 2011;99(18):181110(1--3).

\end{thebibliography}

\end{document}

