%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Fedorov_etal2018} Fedorov, G., Gayduchenko, I., Titova, N., Moskotin, M., Obraztsova, E., Rybin, M., et al. (2018). Graphene-based lateral Schottky diodes for detecting terahertz radiation. In F. Berghmans, \& A. G. Mignani (Eds.), \textit{Proc. Optical Sensing and Detection V} (Vol. 10680, pp. 30--39). Spie.

\end{thebibliography}

\end{document}

