%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Schuck_etal2013} Schuck, C., Pernice, W. H. P., Minaeva, O., Li, M., Gol{\textquoteright}tsman, G., Sergienko, A. V., et al. (2013). Matrix of integrated superconducting single-photon detectors with high timing resolution. \textit{IEEE Trans. Appl. Supercond.}, \textit{23}(3), 2201007.

\end{thebibliography}

\end{document}

