%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Baselmans_etal2006} Baselmans, J. J. A., Baryshev, A., Reker, S. F., Hajenius, M., Gao, J. R., Klapwijk, T. M., et al. (2006). Influence of the direct response on the heterodyne sensitivity of hot electron bolometer mixers. \textit{J. Appl. Phys.}, \textit{100}(8), 084510 (1 to 7).

\end{thebibliography}

\end{document}

