%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Yang_etal2006} Yang, Z. Q., Hajenius, M., Baselmans, J. J. A., Gao, J. R., Voronov, B., \& Gol{\textquoteright}tsman, G. N. (2006). Reduced noise in NbN hot-electron bolometer mixers by annealing. \textit{Supercond. Sci. Technol.}, \textit{19}(4), L (9 to 12).

\end{thebibliography}

\end{document}

