%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Voronov_etal1992} Voronov, B. M., Gershenzon, E. M., Gol{\textquoteright}tsman, G. N., Gogidze, I. G., Gusev, Y. P., Zorin, M. A., et al. (1992). Picosecond range detector base on superconducting niobium nitride film sensitive to radiation in spectral range from millimeter waves up to visible light. \textit{Sverkhprovodimost{\textquoteright}: Fizika, Khimiya, Tekhnika}, \textit{5}(5), 955--960.

\end{thebibliography}

\end{document}

