%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Shcherbatenko_etal2021} Shcherbatenko, M., Elezov, M., Manova, N., Sedykh, K., Korneev, A., Korneeva, Y., et al. (2021). Single-pixel camera with a large-area microstrip superconducting single photon detector on a multimode fiber. \textit{Appl. Phys. Lett.}, \textit{118}(18), 181103.

\end{thebibliography}

\end{document}

