%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Smirnov_etal2007} Smirnov, K., Korneev, A., Minaeva, O., Divochiy, A., Tarkhov, M., Ryabchun, S., et al. (2007). Ultrathin NbN film superconducting single-photon detector array. In \textit{J. Phys.: Conf. Ser.} (Vol. 61, pp. 1081--1085).

\end{thebibliography}

\end{document}

