%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Yang_etal2007} Yang, J. K. W., Kerman, A. J., Dauler, E. A., Anant, V., Rosfjord, K. M., \& Berggren, K. K. (2007). Modeling the electrical and thermal response of superconducting nanowire single-photon detectors. \textit{IEEE Trans. Appl. Supercond.}, \textit{17}(2), 581--585.

\end{thebibliography}

\end{document}

