%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Morozov_etal2021} Morozov, P., Lukina, M., Shirmanova, M., Divochiy, A., Dudenkova, V., Gol{\textquoteright}tsman, G. N., et al. (2021). Singlet oxygen phosphorescence imaging by superconducting single-photon detector and time-correlated single-photon counting. \textit{Opt. Lett.}, \textit{46}(6), 1217--1220.

\end{thebibliography}

\end{document}

