%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Tretyakov_etal2018} Tretyakov, I., Kaurova, N., Voronov, B. M., \& Goltsman, G. N. (2018). About effect of the temperature operating conditions on the noise temperature and noise bandwidth of the terahertz range NbN hot-electron bolometers. In \textit{Proc. 29$^{th}$ Int. Symp. Space Terahertz Technol.} (113).

\end{thebibliography}

\end{document}

