%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Lusche_etal2013} Lusche, R., Semenov, A., Huebers, H. - W., Ilin, K., Siegel, M., Korneeva, Y., et al. (2013). Effect of the wire geometry and an externally applied magnetic field on the detection efficiency of superconducting nanowire single-photon detectors. In \textit{INIS} (Vol. 46, pp. 1--3).

\end{thebibliography}

\end{document}

