%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Semenov_etal1993} Semenov, A. D., Sergeev, A. V., Kouminov, P., Goghidze, I. G., Heusinger, M. A., Nebosis, R. S., et al. (1993). Transparency of YBCO film/substrate interfaces for thermal phonons determined by photoresponse measurements. In H. C. Freyhardt (Ed.), \textit{Proc. 1st European Conf. on Appl. Supercond.} (Vol. 2, pp. 1443--1446).

\end{thebibliography}

\end{document}

