%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Kerr1995} Kerr, A. R. (1995). Some fundamental and practical limits on broadband matching tocapacitive devices, and the implications for SIS mixer design. \textit{IEEE Trans. Microw. Theory Techn.}, \textit{43}(1), 2--13.

\end{thebibliography}

\end{document}

