%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Shitov+Vystavkin2006} Shitov, S. V., \& Vystavkin, A. N. (2006). A design analysis of imaging radiometer with antenna-coupled transition-edge sensors. \textit{Nuclear Instruments and Methods in Physics Research A}, \textit{559}, 503--505.

\end{thebibliography}

\end{document}

