%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Gerecht_etal2000} Gerecht, E., Musante, C. F., Zhuang, Y., Ji, M., Yngvesson, K. S., Goyette, T., et al. (2000). NbN hot electron bolometric mixer with intrinsic receiver noise temperature of less than five times the quantum noise limit. In \textit{Proc. IMS} (Vol. 2, pp. 1007--1010).

\end{thebibliography}

\end{document}

