%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{D.Henrich2012} D. Henrich, L. R. S. D., M. Hofherr, K. Il{\textquoteright}in, A. Semenov, and M. Siegel. (2012). Detection efficiency of a spiral-nanowire superconducting single-photon detector. arXiv:1210.3988. Retrieved June 1, 2024, from http://arxiv.org/abs/1210.3988

\end{thebibliography}

\end{document}

