%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Shurakov_etal2015} Shurakov, A., Maslennikov, S., Tong, C. -yu E., \& Gol{\textquoteright}tsman, G. (2015). Performance of an HEB direct detector utilizing a microwave reflection readout scheme. In \textit{Proc. 26$^{th}$ Int. Symp. Space Terahertz Technol.} (36).

\end{thebibliography}

\end{document}

