%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Lobanov_etal2017} Lobanov, Y., Shcherbatenko, M., Semenov, A., Kovalyuk, V., Kahl, O., Ferrari, S., et al. (2017). Superconducting nanowire single photon detector for coherent detection of weak signals. \textit{IEEE Trans. Appl. Supercond.}, \textit{27}(4), 1--5.

\end{thebibliography}

\end{document}

