%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Zolotov_etal2017} Zolotov, P., Vakhtomin, Y., Divochiy, A., Morozov, P., Seleznev, V., \& Smirnov, K. (2017). Development of fast and high-effective single-photon detector for spectrum range up to 2.3 μm. In \textit{Proc. SPBOPEN} (pp. 439--440).

\end{thebibliography}

\end{document}

