%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Lusche_etal2014} Lusche, R., Semenov, A., Ilin, K., Siegel, M., Korneeva, Y., Trifonov, A., et al. (2014). Effect of the wire width on the intrinsic detection efficiency of superconducting-nanowire single-photon detectors. \textit{J. Appl. Phys.}, \textit{116}(4), 043906 (1 to 9).

\end{thebibliography}

\end{document}

