%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Lusche_etal2013} Lusche, R., Semenov, A., Il{\textquoteright}in, K., Korneeva, Y., Trifonov, A., Korneev, A., et al. (2013). Effect of the wire width and magnetic field on the intrinsic detection efficiency of superconducting nanowire single-photon detectors. \textit{IEEE Trans. Appl. Supercond.}, \textit{23}(3), 2200205.

\end{thebibliography}

\end{document}

