%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Zhang_etal2007} Zhang, W., Li, N., Jiang, L., Miao, W., Lin, Z. - H., Yao, Q. - J., et al. (2007). Noise behaviour of a THz superconducting hot-electron bolometer mixer. \textit{Chinese Phys. Lett.}, \textit{24}(6), 1778--1781.

\end{thebibliography}

\end{document}

