%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Slysz_etal2007} Slysz, W., Wegrzecki, M., Bar, J., Grabiec, P., Gorska, M., Rieger, E., et al. (2007). Fiber-coupled NbN superconducting single-photon detectors for quantum correlation measurements. In M. Dusek, M. S. Hillery, W. P. Schleich, I. Prochazka, A. L. Migdall, \& A. Pauchard (Eds.), \textit{Proc. SPIE} (Vol. 6583, 65830J (1 to 11)). Spie.

\end{thebibliography}

\end{document}

