%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Baubert_etal2005} Baubert, J., Salez, M., Merkel, H., Pons, P., Cherednichenko, S., Lecomte, B., et al. (2005). IF gain bandwidth of membrane-based NbN hot electron bolometers for SHAHIRA. \textit{IEEE Trans. Appl. Supercond.}, \textit{15}(2), 507--510.

\end{thebibliography}

\end{document}

