%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Goltsman_etal2005} Gol{\textquoteright}tsman, G. N., Korneev, A., Rubtsova, I., Milostnaya, I., Chulkova, G., Minaeva, O., et al. (2005). Ultrafast superconducting single-photon detectors for near-infrared-wavelength quantum communications. \textit{Phys. Stat. Sol. (C)}, \textit{2}(5), 1480--1488.

\end{thebibliography}

\end{document}

