%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Zhang_etal2003} Zhang, J., Pearlman, A., Slysz, W., Verevkin, A., Sobolewski, R., Okunev, O., et al. (2003). Infrared picosecond superconducting single-photon detectors for CMOS circuit testing. In \textit{CLEO/QELS} (Cmv4). Optical Society of America.

\end{thebibliography}

\end{document}

