%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Baselmans_etal2004} Baselmans, J. J. A., Hajenius, M., Gao, J., de Korte, P., Klapwijk, T. M., Voronov, B., et al. (2004). Doubling of sensitivity and bandwidth in phonon-cooled hot-electron bolometer mixers. In J. Zmuidzinas, W. S. Holland, \& S. Withington (Eds.), \textit{Proc. SPIE} (Vol. 5498, pp. 168--176). SPIE.

\end{thebibliography}

\end{document}

