%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Matyushkin_etal2020} Matyushkin, Y., Danilov, S., Moskotin, M., Belosevich, V., Kaurova, N., Rybin, M., et al. (2020). Helicity-sensitive plasmonic terahertz interferometer. \textit{Nano Lett.}, \textit{20}(10), 7296--7303.

\end{thebibliography}

\end{document}

