%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Korneeva_etal2021} Korneeva, Y. P., Manova, N. N., Dryazgov, M. A., Simonov, N. O., Zolotov, P. I., \& Korneev, A. A. (2021). Influence of sheet resistance and strip width on the detection efficiency saturation in micron-wide superconducting strips and large-area meanders. \textit{Supercond. Sci. Technol.}, \textit{34}(8), 084001.

\end{thebibliography}

\end{document}

