%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Smirnov_etal2012} Smirnov, A. V., Karmantsov, M. S., Smirnov, K. V., Vakhtomin, Y. B., Masterov, D. V., Tarkhov, M. A., et al. (2012). Terahertz response of thin-film YBCO bolometers. \textit{Tech. Phys.}, \textit{57}(12), 1716--1719.

\end{thebibliography}

\end{document}

