%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Mather1984} Mather, J. (1984). Electrical self-heating calibration of nonideal bolometers. \textit{Appl. Optics.}, \textit{23}(18), 3181--3183.

\end{thebibliography}

\end{document}

