%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Gershenzon_etal1989} Gershenzon, E. M., Goltsman, G. N., Semenov, A. D., \& Sergeev, A. V. (1989). Limiting characteristic of fast superconducting bolometers. \textit{Sov. Phys.-Tech. Phys.}, \textit{34}, 195--199.

\end{thebibliography}

\end{document}

