%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Karasik_etal1996} Karasik, B. S., Il{\textquoteright}in, K. S., Pechen, E. V., \& Krasnosvobodtsev, S. I. (1996). Diffusion cooling mechanism in a hot-electron NbC microbolometer mixer. \textit{Appl. Phys. Lett.}, \textit{68}(16), 2285--2287.

\end{thebibliography}

\end{document}

