%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Brown1998} Brown, R. L. (1998). Technical specification of the Millimeter Array. In T. G. Phillips (Ed.), \textit{Proc. SPIE, Advanced Technology MMW, Radio, and Terahertz Telescopes, vol. 3357} (pp. 231--237).

\end{thebibliography}

\end{document}

