%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Goltsman_etal2006} Gol{\textquoteright}tsman, G., Korneev, A., Minaeva, O., Antipov, A., Divochiy, A., Kaurova, N., et al. (2006). Middle-infrared to visible-light ultrafast superconducting single-photon detector. In \textit{Proc. ASC}. Seattle.

\end{thebibliography}

\end{document}

