%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Delacour_etal2007} Delacour, C., Claudon, J., Poizat, J. - P., Pannetier, B., Bouchiat, V., de Lamaestre, R. E., et al. (2007). Superconducting single photon detectors made by local oxidation with an atomic force microscope. \textit{Appl. Phys. Lett.}, \textit{90}(19), 191116 (1 t0 3).

\end{thebibliography}

\end{document}

